1 2 3 4 5 10^5

1.2 1.3 1.4 10^{-3}

SE_E_Ah (Interval)

1 2 3 4 5 10^5 0 2 4 10^{-6}SE_E_Ah (m2)

1 2 3 4 5 10^5 0

5 10^{-8}SE_E_Ah (m3)

1 2 3 4 5 10^5

6 7 8 10^{-4}SE_Emp (Interval)

1 2 3 4 5 10^5

5

10 10^{-8}SE_Emp (m2)

1 2 3 4 5 10^5 0

5 10^{-11}SE_Emp (m3)

1 2 3 4 5 10^5 0.2 0.4 0.6 SE_eps_ltv (Interval)

1 2 3 4 5 10^5 0

0.05

SE_eps_ltv (m2)

1 2 3 4 5 10^5 0 0.02

0.04

SE_eps_ltv (m3)